%#!latexmk main.tex
\section{Methodology}
\subsection{Experimental}
\subsubsection{Sample Preparation}

hogehoge

\subsubsection{Solid-State NMR}

hogehoge

\subsection{Computational}

hogehoge

\subsubsection{Development of MLP}

Table~\ref{tab:sosei}を説明する段落文章。
\begin{table}[H]
\caption{TABLE caption}\label{tab:sosei}
 \begin{tabular}
  {wc{1.5cm}wc{3.6cm}|wc{3.6cm}|wc{3.6cm}|wc{1.5cm}}
\hline
 Label & Composition & $D$ & $T$ & $N$ \\
\hline
  30Zn & 30ZnO-70\ce{P2O5} & 0.97, 1.00, 1.03 & 300, 1000, 3000 & 18000\\
  40Zn & 40ZnO-60\ce{P2O5} & 0.97, 1.00, 1.03 & 300, 1000, 3000 & 18000\\
  50Zn & 50ZnO-50\ce{P2O5} & 0.97, 1.00, 1.03 & 300, 1000, 3000 & 18000\\
  60Zn & 60ZnO-40\ce{P2O5} & 0.97, 1.00, 1.03 & 300, 1000, 3000 & 18000\\
  70Zn & 70ZnO-30\ce{P2O5} & 0.97, 1.00, 1.03 & 300, 1000, 3000 & 18000\\
\hline
 \end{tabular}
\end{table}

\subsubsection{MLMD Simulation}

hogehoge