\documentclass[a4paper, 11pt]{article}
\usepackage[top=2.5cm, bottom=2.5cm, left=2.5cm, right=2.5cm]{geometry}
\usepackage[version=4]{mhchem}
\usepackage{siunitx}

\input{../macro}

\oddsidemargin=-0.4mm     % 25.4-0.4=25mm
\evensidemargin=-0.4mm    
\textwidth=160mm          % 210-25*2=160

\linespread{1.1}

% 箇条書き
\renewenvironment{itemize}{\begin{list}{\textbullet}{\topsep=0.4pt}}{\end{list}}

\title{Answers in response to the reviewer comments} 
%%\date{}

\newcommand{\lineline}{\color{blue}------------------------------------------}

\begin{document}
\maketitle 

\noindent \noindent Manuscript\\ 
\noindent Journal: {JOURNAL}\\

\vspace{1zw}

\noindent Title: ``{\TITLE}''\\
\noindent Authors: Kawano, Shoma;  Ohkubo, Takahiro\\
\noindent Manuscript ID: {\ManuscriptID}

\vspace{1zw}
\noindent Corresponding Author: Ohkubo, Takahiro


\vspace*{0.5cm}

\noindent Dear Prof. Xxxxx Yyyyy,

We thank you for your letter dated 30 March 2026 regarding our
manuscript (Manuscript ID: {\ManuscriptID}) and for conveying the
reviewers' constructive comments. We have revised the manuscript in
accordance with these comments, as detailed in the point-by-point
responses below.

\vspace{1zw}

\vspace*{0.5cm}
\input{reviewer1}
\input{reviewer2}
\input{reviewer3}
\input{editor}

\end{document}
